-- Create the missing declarationtva_config table
CREATE TABLE IF NOT EXISTS `llx_declarationtva_config` (
  `rowid` int(11) NOT NULL AUTO_INCREMENT,
  `entity` int(11) NOT NULL DEFAULT 1,
  `config_key` varchar(64) NOT NULL,
  `config_value` text,
  `created_date` datetime DEFAULT NULL,
  PRIMARY KEY (`rowid`),
  UNIQUE KEY `uk_config_entity_key` (`entity`, `config_key`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;
